The 4 most common 360 degree feedback mistakes

Even people with rhino hide for skin get nervous opening their 360 degree feedback report. Everyone you work with has rated you on your behaviour, skills and experience. Everyone. There’s no place to run to and no place to hide.

The post The 4 most common 360 degree feedback mistakes appeared first on Management for the Rest of Us.